LIBRARY libcelt-0110.dll
EXPORTS
    celt_decode_0110
    celt_decoder_create_custom_0110
    celt_decoder_destroy_0110
    celt_mode_create_0110
    celt_mode_destroy_0110
    celt_mode_info_0110
; symbols not used by vgmstream were ommited
